beam

|-yη|

8- 7- 6- 5- 4- 3- 2- 1- 0 1

2v

0

0.02

0.04

0.06

0-40%: event average

Pb-Pb 2.76 TeV {2} 2 ALICE v

{EP} 2 PHOBOS v Au-Au 200 GeV Au-Au 130 GeV Au-Au 62.4 GeV Au-Au 19.6 GeV